0 5 10 15 20 0

200

400

600

[ppb]

0 2 4 6 8 10

[%]

Acetone [ppb] Water [%]

0 5 10 15 20 0

500

1000

1500

[s]

[ml]

0

100

200

300

400

[ml/s] exhalation volume [ml] exhalation flow rate [ml/s]

4.5 5 5.5 6 6.5 7 300 400 500 600 700 800

Acetone [ppb]

Water [%] r^2 = 0.9431